R-6.01, r. 3

Regulation respecting the fees payable to the Régie de l’énergie

Updated to 11November 30 2024

chapter R-6.01, r. 3

Regulation respecting the fees payable to the Régie de l’énergie

RÉGIE DE L’ÉNERGIE — FEES PAYABLE

Act respecting the Régie de l’énergie

(chapter R-6.01, s. 112).

R-6.01

09September 011 2012

1. The fees payable for an application referred to in section 94 of the Act respecting the Régie de l’énergie (chapter R-6.01) are $30. The fees are reimbursed to the complainant by the Régie if it considers the complaint to be founded.

O.C. 735-2004, s. 1; O.C. 791-2006, s. 1.

2. The fees payable for an application, other than an application referred to in section 94 of the Act, submitted by a person other than the electric power carrier or a distributor subject to the payment of a duty under a regulation, are $500.

O.C. 735-2004, s. 2.

3. This Regulation replaces the Regulation respecting the fees payable to the Régie de l’énergie (O.C. 52-98, 98-01-14).

O.C. 735-2004, s. 3.

4. (Omitted).

O.C. 735-2004, s. 4.